en	Migration Assistant (Version: %s)

en	Update
fi	Päivitä

en	Isotope needs to know which JavaScript template is responsible to render the lightbox for a gallery. Please select the appropriate template for each gallery (usually <i>moo_mediabox</i> or <i>j_colorbox</i>) depending on if you use MooTools or jQuery on your website. You can always change this later in the gallery settings.