en	Title

en	Please enter a title for this gateway.

en	Type

en	Please select a type for this gateway.

en	Target gateway

en	This gateway will queue all the messages and then send them over the gateway you define here.

en	Enable poor man's cronjob

en	This will register this queue gateway to the poor man's cronjob.

en	Interval

en	Choose the interval you would like to have this queue gateway be invoked.

en	Number of messages

en	Here you can enter the number of messages that should be sent per invocation.

en	Override SMTP settings

en	This gateway will take the Contao e-mail settings by default. If you want to override the SMTP settings for this specific gateway, activate this checkbox.

en	File type

en	Please choose the file type.

en	Connection type

en	Please choose the connection type.

en	Host name

en	Please enter the host name.

en	Port number

en	Here you can enter the port number. Leave empty to use the default.

en	Username

en	Please enter the username.

en	Password

en	Please enter the password.

en	Path

en	Here you can enter the path (e.g. <em>downloads</em>).

en	Postmark API key

en	Please enter your unique Postmark API key.

en	Enable test mode

en	Here you can enable the test mode.

en	Enable SSL

en	Here you can enable the SSL connection.

en	Send e-mails via SMTP

en	Use an SMTP server instead of the PHP mail() function to send e-mails.

en	SMTP hostname

en	Please enter the host name of the SMTP server.

en	SMTP username

en	Here you can enter the SMTP username.

en	SMTP password

en	Here you can enter the SMTP password.

en	SMTP encryption

en	Here you can choose an encryption method (SSL or TLS).

en	SMTP port number

en	Please enter the port number of the SMTP server.

en	Queue

en	Standard email gateway

en	Write to file

en	Postmark (postmarkapp.com)

en	Every minute

en	Every hour

en	Every day

en	Every week

en	Every month

en	CSV

en	Plain Text / XML

en	Local

en	FTP

en	Connection successful

en	Could not connect to the FTP server!

en	Could not login to the FTP server!

en	New gateway

en	Create a new gateway.

en	Edit gateway

en	Edit gateway ID %s.

en	Copy gateway

en	Copy gateway ID %s.

en	Delete gateway

en	Delete gateway ID %s.

en	Gateway details

en	Show details for gateway ID %s.

en	Title & type

en	Gateway settings

en	Cronjob settings

en	Queued messages will remain in the queue forever unless you trigger the sending mechanism by either using a real cron job or the Contao internal poor man's cronjob. The Notification Center is shipped with a binary that can be executed using a real cronjob. To setup a real cronjob that invokes the queue of this queue gateway (ID: {gateway_id}) and send 15 messages every 10 minutes, you would need to setup the following crontab: <br><blockquote>*/10 * * * * /path/to/contao/system/modules/notification_center/bin/queue -s {gateway_id} -n 15</blockquote><br> or let's say you want to send 30 messages every 5 minutes after every hour, then you would set it up like this: <br><blockquote>5 * * * * /path/to/contao/system/modules/notification_center/bin/queue -s {gateway_id} -n 30</blockquote><br> If you don't have access to real cronjobs then you can enable the poor man's cron. Note that it doesn't provide the same flexibility in terms of interval settings and it is subject to the web execution context and thus certainly affected by PHP configurations such as the maximum execution time. Thus, try to keep the number of messages sent per invocation as low as possible. <br><br> <strong>Note: </strong>When you installed the notification center using Composer, the path to the binary differs: <blockquote> /path/to/contao/composer/vendor/terminal42/notification_center/bin/queue </blockquote>

en	Delayed delivery

en	Enter a <a href="https://php.net/strtotime" target="_blank"><i>strtotime</i></a> time interval to delay message delivery (e.g. <em>+1 day</em>).